GREY: N1730-21 IPOL 330.000 MHZ KEPLER.PBCOR.1

Grey scale flux range= -0.050 3.500 JY/BEAM

0 1 2 3

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 31 00 30 55 50 45 40 35 30 25 20

-21 2526272829303132333435