GREY: N1730-21 IPOL 330.000 MHZ N1730-21.PBCOR.2

Grey scale flux range= -10.0 200.0 MilliJY/BEAM

0 50 100 150 200

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 34 30 00 33 30 00 32 30 00 31 30 00 30 30 00

-21 001020304050 -22 0010