GREY: G004.2+0 IPOL 330.500 MHZ G004.2+00.0.PBCOR.3

PLot file version 1 created 23-FEB-2001 17:03:27

Grey scale flux range= -1.000 5.000 MilliJY/BEAM

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 56 15 00 55 45 30 15 00 54 45 30

-25 0005101520