NONE 3.8+0.3.IRAS.REGRD.2

Grey scale flux range= 350.0 700.0 MJY/SR

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 56 00

55 45

30150054 45

-25 00

05101520400500600700