GREY: 1722-28 RR 328.062 MHZ 1722-28.PBCOR.3

Grey scale flux range= -20.0 100.0 MilliJY/BEAM

050100

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 29 28 27 26 25 24 23

-27 50 -28 001020304050 -29 001020