GREY: G356.3-0 IPOL 332.375 MHZ G356.3-01.5.REGRD.6

Grey scale flux range= -3.00 10.00 MilliJY/BEAM

-202468

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 45 15

0044 45

301500-32 28

303234363840424446