BOTH: G356.3-0 IPOL 332.375 MHZ G356.3-01.5.MATHS.1

Grey scale flux range= -4.0 200.0 MilliJY/BEAM Cont peak flux = 7.4068E-01 JY/BEAM Levs = 3.000E-03 * (-5, -3, 3, 10, 15, 20, 30, 35, 40, 80, 100) 0 50 100 150 200

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 43 30

150042 45

30150041 45

-32 40

455055-33 00 05