GREY: G356.3-0 IPOL 332.375 MHZ G356.3-01.5.PBCOR.5

Grey scale flux range= -25.0 150.0 MilliJY/BEAM 0 50 100 150

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 46 45 44 43 42 41 40

-32 1020304050 -33 00102030