GREY: G356.3-0 IPOL 332.375 MHZ G356.3-01.5.PBCOR.4

Grey scale flux range= -5.00 40.00 MilliJY/BEAM 0 10 20 30

DECLINATION

RIGHT ASCENSION

17 45 00 44 30 00 43 30 00 42 30 00 41 30

-32 303540455055 -33 000510