GREY: SURVEY. SURVEY..REGRD.1

Grey scale flux range= 150.0 1000.0 JY/BEAM 200 400 600 800 1000

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 57 15 00 56 45 30 15 00 55 45 30 15

-25 10152025303540