BOTH: SURVEY. SURVEY..REGRD.2

Grey scale flux range= -0.050 1.000 Kilo Cont peak flux = 9.4148E+03 Levs = 2.000E+02 * (-1, 1, 1.500, 2, 2.300, 2.500, 3, 5, 7) 0.0 0.2 0.4 0.6 0.8

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 54 30

0053 30

0052 30

00-25 05

10152025303540