GREY: NONE 3.8+0.3.IRAS.HGEOM.1

CONT: G003.7-0 IPOL 327.938 MHZ G003.7-00.0.MATHS.3

Grey scale flux range= 220.0 350.0 MJY/SR Cont peak flux = 5.7350E-01 JY/BEAM Levs = 1.500E-03 * (3, 8, 16, 32)

250300350

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 54 30 00 53 30 00 52 30 00 51 30 00

-25 00051015202530354045