BOTH: G003.7-0 IPOL 327.938 MHZ G003.7-00.0.REGRD.1

PLot file version 1 created 17-SEP-2000 22:54:31

Grey scale flux range= -23.5 149.6 MilliJY/BEAM Cont peak flux = 1.4962E-01 JY/BEAM Levs = 1.000E-03 * (-5, -3, 2, 5, 10, 15, 20)

050100

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 53 45 30 15 00 52 45 30 15

-25 101520253035