GREY: C1752M24 IPOL 1400.000 MHZ I1752M24.I.1

PLot file version 1 created 19-SEP-2000 13:11:17

Grey scale flux range= 0.0 100.0 MilliJY/BEAM 0 50 100

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 54 40

35302520-25 48

495051525354