GREY: NONE NONE.IMAP.2

PLot file version 1 created 19-SEP-2000 16:41:17

Grey scale flux range= 155.5 291.2 MJY/SR 160 180 200 220 240 260 280

DECLINATION (B1950)

RIGHT ASCENSION (B1950)

17 58 15

0057 45

3015-25 46

485052545658-26 00 02