GREY: NONE G3.6-0.1.REGRD.1

PLot file version 1 created 16-OCT-2000 13:01:23

Grey scale flux range= 390.0 700.0 MJY/SR

400 500 600 700

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 55 30 15 00 54 45 30 15 00 53 45 30

-25 40455055 -26 0005