GREY: l3.7-0.2 IPOL 1424.787 MHZ G003.8-00.3.CONVL.1

PLot file version 1 created 20-OCT-2000 12:34:12

Grey scale flux range= -0.60 32.53 MilliJY/BEAM

0 10 20 30

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 54 40

35302520-25 49

5051525354