GREY: G003.7-0 IPOL 327.938 MHZ G003.7-00.0.REGRD.2

PLot file version 1 created 19-SEP-2000 12:46:30

Grey scale flux range= 0.000 8.000 MilliJY/BEAM 0 2 4 6 8

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 54 38 36 34 32 30 28 26

-25 49 30 50 0030 51 0030 52 0030 53 0030