BOTH: G003.7-0 IPOL 327.938 MHZ G003.7-00.0.MATHS.1

Grey scale flux range= -5.00 60.00 MilliJy Cont peak flux = 4.7912E-01 MilliJy/BEAM Levs = 3.105E-03 * (-5, -3, 1, 3, 4.500, 6, 9, 12, 15, 40, 80)

0 20 40 60

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 54 36 34 32 30 28 26

-25 49 30

50 00

30

51 00

30

52 00

30

53 00