GREY: FC9 IPOL 4860.100 MHZ FC9.REGRD.1

PLot file version 1 created 26-JAN-2001 11:13:39

Grey scale flux range= -0.59 30.00 MilliJY/BEAM 0 10 20

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 54 50 45 40 35 30 25 20 15 10

-25 47484950515253545556