GREY: G001.4-0 IPOL 335.750 MHZ G001.4-00.1.REGRD.1

PLot file version 1 created 01-MAR-2001 11:09:05

Grey scale flux range= -20.00 80.00 MilliJY/BEAM

0 20 40 60

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 50 15 00 49 45 30 15 00 48 45

-27 35

40

45

50

55