GREY: G001.4-0 IPOL 335.750 MHZ G001.4-00.1.REGRD.1

Grey scale flux range= -30.00 60.00 MilliJY/BEAM -20 0 20 40

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 53 52 51 50 49 48 47

-27 001020304050 -28 00102030