GREY: G356.3-0 IPOL 332.375 MHZ G356.3-01.5.MATHS.3

PLot file version 1 created 25-OCT-2000 15:22:37

Grey scale flux range= -4.00 81.00 MilliJY/BEAM 0 20 40 60 80

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 46 00 45 45 30 15 00 44 45 30 15 00

-32 3035404550