GREY: G003.7-0 IPOL 327.938 MHZ G003.7-00.0.MATHS.1

PLot file version 2 created 21-SEP-2000 14:15:18

Grey scale flux range= -5.00 17.00 MilliJy/BEAM

0 5 10 15

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

17 53 45 30 15 00 52 45 30 15

-25 15202530