The worst sidelobe = 0.231; X = -1.2; Y = 0.0 Input: 64 points in circle. Iteration number 1. Elev = 90deg

Plot file version 113 created 20-OCT-1999 11:29:29

Y-unit

X-unit

-1.0 -0.5 0.0 0.5 1.0

1.0

0.5

0.0

-0.5

-1.0