Grey scale flux range= -0.001 1.802 Jy/beam Cont peak flux = 1.8019E+00 Jy/beam Levs = 6.000E-04 * (-1, 1, 1.414, 2, 2.828, 4, 5.657, 8, 11.31, 16, 22.63, 32, 45.25, 64, 90.51, 128, 181.0, 256, 362.0, 512, 256, 362.0, 512, 724.1, 1024, 1450, 2048, 2900)

0.00.51.01.5

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

01 37 41.40 41.35 41.30 41.25 41.20

33 09 36.5

36.0

35.5

35.0

34.5

34.0