BOTH: 1331+305 IPOL 1425.000 MHZ 3C286 L.ICL001.1

PLot file version 1 created 18-NOV-2005 16:15:49

Grey scale flux range= 0.00 14.61 JY/BEAM Cont peak flux = 1.4613E+01 JY/BEAM Levs = 2.500E-03 * (-1, 1, 2, 4, 8, 16, 32, 64, 128, 256, 512, 1024, 2048, 4096, 8192)

0510

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

13 31 08.8

08.6

08.4

08.2

08.0

07.8

07.6

30 30 42

403836343230282624