Plot file version 2 created 07-NOV-2008 17:26:46 Amplitude vs UV dist for 3C147 X ABCD.CALIB.9 Source:0542+498 Ants * - * Stokes HALF IF# 1 - 2 Chan# 1

Janskys

Kilo Wavlngth

0 100 200 300 400 500 600 700 800 900

5.0

4.5

4.0

3.5

3.0

2.5

2.0

1.5

1.0

0.5

0.0