Grey scale flux range= 0.00 21.09 Jy/Beam Cont peak flux = 21.086 Jy/Beam Levs = 2.400E-03 * (-1, 1, 2, 4, 8, 16, 32, 64, 128, 256, 512, 1024, 2048, 4096, 8192) 0 5 10 15 20

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

05 42 39 38 37 36 35 34

49 51 30252015100500 50 55504540