Amplitude vs UV dist for 3C147 L.MODEL.1 Source:0542+498 Ants * - * Stokes HALF IF# 1 - 2 Chan# 1

Janskys

Kilo Wavlngth

0 20 40 60 80 100 120 140 160

20

15

10

5

0