Center at RA 05 21 09.9039000 DEC 16 38 22.116000

BOTH: 0521+166 IPOL 8485.100 MHZ 0521 X ALL.ICL001.36

PLot file version 3 created 28-MAR-2006 10:29:29

Grey scale flux range= -0.001 1.582 JY/BEAM Cont peak flux = 1.5816E+00 JY/BEAM Levs = 4.000E-04 * (-1, 1, 1.414, 2, 2.828, 4, 5.657, 8, 11.31, 16, 22.63, 32, 45.25, 64, 90.51, 128, 181.0, 256, 362.0, 512, 724.1, 1024, 1450, 2048, 2900, 4096, 5790, 8192, 11590, 16384)

0.00.51.01.5

ARC SEC

ARC SEC

1.0 0.5 0.0 -0.5 -1.0

1.00.50.0 -0.5-1.0