; UV5TYPE
;---------------------------------------------------------------
;! Convolving function type 5, spheroidal function
;# INFORMATION UV
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 1997
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
UV5TYPE   LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
UV5TYPE
Type: information only.
Information:  Convolving function type 5 = Spheriodal function.

      Parameters are:
         PARM(1) = Support size.  0 --> 3.0 cells
         PARM(2) = ALPHA.  0 --> 1.0
         PARM(3) = Scale factor for support size.  0 --> 1.0
      See memo by Fred Schwab for more details; large support
      size may have undesired results.
      Changing these can put divides by zero in the map plane
      and can reduce the degree of alias suppression.  See
      the VLA Scientific Memo Series 123, 124, 129, and 131.

      Types 5 and -5 are rectilinear (in X and Y separately), types 15
      and -15 are circular (in R = sqrt(X*X+Y*Y)).

      Types -5 and -15 are for single-dish use and have units of arc
      seconds for PARM(1) with default = single-dish-beam_size.

Tasks:
HORUS....Interferometer imaging with calibration, no Cleaning.
IMAGR....Interferometer imaging with calibration, Cleaning, and
         wide-field corrections.
MX.......Interferometer imaging with Cleaning, no calibration.
SCMAP....Interferometer imaging with Cleaning, self-calibration and
         interactive editing.
UVMAP....Interferometer imaging with no Cleaning, no calibration.
WFCLN....Interferometer imaging with Cleaning and wide-field
         corrections, but no calibration.

COMPL....Plot aspects of the convolving functions.

BSGEO....Single-dish re-grid from pseudo az-el to RA-dec.
BSGRD....Single-dish continuum beam-switched imaging and correction.
SDIMG....Single-dish imaging able to do large fields (with large scratch
         files).
SDGRD....Single-dish imaging.
----------------------------------------------------------------
