; TVAGUESS
;---------------------------------------------------------------
;! Verb to re-plot slice model guess directly on TV graphics
;# VERB ANALYSIS ONED MODELING PLOT TV
;-----------------------------------------------------------------------
;;  Copyright (C) 2000
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
TVAGUESS  LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
TVAGUESS: Verb to re-plot slice model guess directly on TV
USERID     -32000.0     32000.0    User ID. 0 => current user,
                                     32000 => any user.
INNAME                             Image name (name)
INCLASS                            Image name (class)
INSEQ           0.0      9999.0    Image name (seq. #)
INDISK          0.0         9.0    Disk drive #
INVERS          0.0     46655.0    Version # of SL file. 0=>last
PIXRANGE                           Min,Max of image intensity
                                     Max <= Min => entire range
BDROP           0.0      9999.0    Drop slice pts from beginning
EDROP           0.0      9999.0    Drop slice pts from end
GRCHAN          0.0         7.0    Graphics channel to use
GMAX                               Initial guess of max values.
GPOS                               Initial guess of positions.
GWIDTH                             Initial guess of halfwidths.
----------------------------------------------------------------
TVAGUESS
Type: Verb
Use:  Plot the curve described by the initial guess of the Gaussian
      components on top of any existing plot on a TV graphics plane.
      It plots the model slice without clearing the graphics plane and
      without labeling.  TVGUESS clears the graphics plane and labels
      the plot as well as plotting the model described in the adverbs.

      Usage hint:  Start with a TVINIT to clear the TV memory.  Then
      do a TVSLICE to one graphics plane, TVGUESS or TVAGUESS to a
      different graphics plane.  This allows the two to be seen but in
      different colors to aid recognition.  When the plots overlap
      a complementary color is used.  The guess may be replaced
      without a new TVSLICE by either a new TVGUESS or a GRCLEAR;
      TVAGUESS with GRCHAN set for the guess graphics plane.  GROFF
      will make one part of the display invisible without deleting it.
Adverbs:
  USERID......The ID of the owner of the image.  0 => current
              user, 32000 => any user.
  INNAME......Image name (name).        Standard defaults.
  INCLASS.....Image name (class).       Standard defaults.
  INSEQ.......Image name (seq. #).      0 => highest.
  INDISK......Disk unit #.              0 => any.
  INVERS......Version # of SL file.     0 => highest version #
  PIXRANGE....Min,Max of Image intensity.  0 => entire range of
              the slice (not the image).
  BDROP.......No of slice pts to omit from beginning of plot.
  EDROP.......No of slice points to omit from end of plot.
              Note that these are points in the slice not pixels in
              the original image.  Use INEXT='SL'; EXTLIST to see how
              many points are in the slice.
  GRCHAN......TV graphics plane to use.  <= 0 -> 1
  NGAUSS......No of gaussian components.
  GMAX........Initial guess of maximum amplitudes.
  GPOS........Initial guess of positions of the components in
              GPOS(1,i).  GPOS(2,i) not used.
  GWIDTH......Initial guess of widths at 1/2 max amplitude in
              GWIDTH(1,i).  GWIDTH(2,i) and GWIDTH(3,i) are not used.
              Note that the units of GMAX, GPOS, and GWIDTH are those
              in the plot (e.g. mJy, arc sec or Jy, degrees or ??).
----------------------------------------------------------------
