; TBAVG
;---------------------------------------------------------------
;! Time averages data on all baselines.
;# Task UV
;-----------------------------------------------------------------------
;;  Copyright (C) 1995
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
TBAVG     LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
TBAVG     Time averages all data on all baselines.
INNAME                             Input UV file name (name)
INCLASS                            Input UV file name (class)
INSEQ             0.0     9999.0   Input UV file name (seq. #)
INDISK            0.0        9.0   Input UV file disk unit #
OUTNAME                            Output UV file name (name)
OUTCLASS                           Output UV file name (class)
OUTSEQ           -1.0     9999.0   Output UV file name (seq. #)
OUTDISK           0.0        9.0   Output UV file disk unit #.
SOLINT                             Averaging interval (sec)
----------------------------------------------------------------
TBAVG
Task:  This task time averages data on all baselines for a
       specified averaging time and writes it to an output file.
       This is useful for measuring time variable point source
       flux densities at the phase center of the data.  Other
       sources should be removed using UVSUB and if necessary,
       the source moved to the phase center using UVFIX or
       CALIB.  All data will be labeled baseline 1-2 even though
       it is in fact an average of all baselines present.
Adverbs:
  INNAME.....Input UV file name (name).      Standard defaults.
  INCLASS....Input UV file name (class).     Standard defaults.
  INSEQ......Input UV file name (seq. #).    0 => highest.
  INDISK.....Disk drive # of input UV file.  0 => any.
  OUTNAME....Output UV file name (name).     Standard defaults.
  OUTCLASS...Output UV file name (class).    Standard defaults.
  OUTSEQ.....Output UV file name (seq. #).   0 => highest unique
  OUTDISK....Disk drive # of output UV file. 0 => highest with
             space for the file.
  SOLINT.....The averaging time in seconds.  Data on all
             baselines will be averaged together for this
             period.
----------------------------------------------------------------
