; SOLMIN
;---------------------------------------------------------------
;! Minimum number of solution sub-intervals in a solution
;# ADVERB CALIBRATION
;-----------------------------------------------------------------------
;;  Copyright (C) 2004
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
SOLMIN    LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
SOLMIN
Type:  Adverb  (scalar)
Use:   This adverb specifies the minimum number of solution
       sub-intervals that willl be used for a solution.  The number of
       solution sub-intervals in a solution (SOLINT) interval is set
       with SOLSUB.  Thus, if a scan is 10 minutes long and SOLINT=6
       and SOLSUB=3, then solution intervals 0-6, 2-8, 4-10, 6-10, and
       8-10 are possible.  If SOLMIN=1, all will be used; if SOLMIN=2,
       the 8-10 is ignored; and if SOLMIN=0 or 3, the 6-10 is also
       ignored.
Null value:
       0   => SOLSUB.
Tasks:
   CALIB.....Determines antenna-based complex gains.
   FRING.....Global fringe-fits to determine antenna-based phase,
             delay, and rate.
   KRING.....Global fringe-fits to determine antenna-based phase,
             delay, and rate.
----------------------------------------------------------------
