; PHNEG
;---------------------------------------------------------------
;! Negates a UV datafile's visibility phase.
;#
;-----------------------------------------------------------------------
;;  Copyright (C) 1998
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
PHNEG     LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
PHNEG     Task which negates all visibility phases in a dataset.
INNAME                             Input UV file name (name)
INCLASS                            Input UV file name (class)
INSEQ             0.0     9999.0   Input UV file name (seq. #)
INDISK            0.0        9.0   Input UV file disk unit #
OUTNAME                            Output UV file name (name)
OUTCLASS                           Output UV file name (class)
OUTSEQ           -1.0     9999.0   Output UV file name (seq. #)
OUTDISK           0.0        9.0   Output UV file disk unit #.
----------------------------------------------------------------
PHNEG
Task:  PHNEG negates the sign of the visibility phase
       for all visibilities in the datafile.  This task was
       created to fix an inconsistency in the phase sign convention
       adopted in the Mitaka correlator FITS generation software.
       Running this task is necesary for FITS data produced directly
       by the Mitaka correlator prior to ?? August 1998.

Adverbs:
  INNAME.....Input UV file name (name).      Standard defaults.
  INCLASS....Input UV file name (class).     Standard defaults.
  INSEQ......Input UV file name (seq. #).    0 => highest.
  INDISK.....Disk drive # of input UV file.  0 => any.
  OUTNAME....Output UV file name (name).     Standard defaults.
  OUTCLASS...Output UV file name (class).    Standard defaults.
  OUTSEQ.....Output UV file name (seq. #).   0 => highest unique
  OUTDISK....Disk drive # of output UV file. 0 => highest with
             space for the file.
----------------------------------------------------------------

Documentor: G. Moellenbrock 98Aug13
