; INTPARM
;---------------------------------------------------------------
;! specifies the parameters of the gain interpolation function
;# ADVERB CALIBRATION
;-----------------------------------------------------------------------
;;  Copyright (C) 1995
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
INTPARM   LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
INTPARM
Type: Adverb  (REAL(3))
Use:  Standard data selection adverb; used to specify the
      parameters of the interpolation function to be applied to
      the gain table:
        For boxcar smoothing INTPARM gives the boxcar width in
        hours.
         (1) => smoothing time for amplitudes,
         (2) => smoothing time for sine and cosine,
         (3) => smoothing time for delay and rate.
        Note: a smoothing time of 0 (or greater) will cause any
        undefined (fit failed) values to be filled in from
        values nearby in time.
      This adverb is only relevant when the data being operated
      on has an associated gain table. See HELP SMOTYPE,
      INTERPOL.
Null value:  0, see above.
----------------------------------------------------------------
