; IMDIST
;---------------------------------------------------------------
;! determines spherical distance between two pixels
;# Verb Analysis Catalog
;-----------------------------------------------------------------------
;;  Copyright (C) 2003
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
IMDIST    LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
IMDIST:  Verb to determine spherical distance between pixelsC
USERID     -32000.0     32000.0    User ID.  0 => current user,
                                     32000 => any user.
INNAME                             Image name(name).
INCLASS                            Image name(class).
INSEQ           0.0      9999.0    Image name(seq. #). 0=>high
INDISK          0.0         9.0    Disk drive #.       0=>any
PIXXY           0.0     16384.0    (X,Y,...) pixel in image
IN2NAME                            Second image name(name).
IN2CLASS                           Second image name(class).
IN2SEQ          0.0      9999.0    Second image seq #.
IN2DISK         0.0         9.0    Second Disk drive #.
PIX2XY          0.0     16384.0    (X,Y,...) pixel in image
         @     Output adverb
DIST     @                         Separation in degrees
----------------------------------------------------------------
IMDIST
Type: Verb
Use: IMDIST uses two pixel coordinates from one or two images to
     determine the spherical angular distance between them.
Adverbs (input):
  USERID......User ID of owner of image.  0 => current user,
                32000 => any user.
      First image pixel
  INNAME......Image name(name).        Standard defaults.
  INCLASS.....Image name(class).       Standard defaults.
  INSEQ.......Image name(seq. #).      0 => highest.
  INDISK......Disk drive # of image.   0 => any.
  PIXXY.......(X,Y,...) pixel location in image.  NOT zero
              on the X and Y axes anyway.
      Second image pixel
  IN2NAME.....Image name(name).        ' ' -> use 1st image
  IN2CLASS....Image name(class).       ' ' -> use 1st image
  IN2SEQ......Image name(seq. #).      0 -> use 1st image
  IN2DISK.....Disk drive # of image.   0 -> use 1st image
  PIX2XY......(X,Y,...) pixel location in image.  NOT zero
              on the X and Y axes anyway.
Adverbs (output):
  DIST........Distance between pixels in degrees.
----------------------------------------------------------------
