; DOSTOKES
;---------------------------------------------------------------
;! selects options related to polarizations
;# ADVERB UV
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2003
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
DOSTOKES  LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
DOSTOKES
Type:  Adverb     (Logical,  > 0  =>  true)
Use:   Selects options related to polarization such as conversion from
       VLA polarizations to true Stokes parameters or flagging across
       polarizations.
Null value:  false (-1).
Tasks:
  DEFLG......Flags uv data based on decorrelation of the data over
             time.  DOSTOKES true means to flag all polarizations when
             one is bad.
  FITTP......Writes FITS tapes of map and UV data.  DOSTOKES true
             requests conversion to true STOKES parameters.
  SNFLG......Flags uv data based on jumps in an SN or CL table.
             DOSTOKES true means to flag all polarizations when one is
             bad.
----------------------------------------------------------------
