; MAPIT_UV
;---------------------------------------------------------------
;! Procedure to MAP and Self-Calibrate a UVDATA set
;# Task AP Imaging
;-----------------------------------------------------------------------
;;  Copyright (C) 1995
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
MAPIT_UV  LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
MAPIT_UV:  UV data weighting and clean parameters input to MAPIT
UVTAPER                            Taper to apply to UV data
UVRANGE                            Range of UV data to include
UVWTFN                             Weighting function for data
GAIN               0.0         2.0 Clean Gain
NBOXES             0.0        50.0 Number of boxes for CLEAN
CLBOX              0.0      8192.0 Four coordinates for each box
BMAJ     *                         FWHM(asec) maj. axis beam
BMIN     *                         FWHM(asec) min. axis beam
BPA      *      -360.0       360.0 CLEAN beam position angle
BADDISK         -1.0          35.0 Disks to avoid for scratch.
----------------------------------------------------------------
