; MAPIT_NA
;---------------------------------------------------------------
;! Procedure to MAP and Self-Calibrate a UVDATA set
;# Task AP Imaging
;-----------------------------------------------------------------------
;;  Copyright (C) 1995
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
MAPIT_NA  LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
MAPIT_NA: Names of data files input to MAPIT
INNAME                             Input UV data (name)
INCLASS                            Input UV data (class)
INSEQ                              Input UV data (seq. #)
INDISK           0.0        9.0    Input UV data disk drive #
IN2NAME                            Point Source UV data (name)
IN2CLASS                           Point Source UV data (class)
IN2SEQ                             Point Source UV data (seq. #)
IN2DISK          0.0        9.0    Point Source UV disk drive #
OUTDISK          0.0        9.0    Output image disk drive #
CELLSIZE         0.0     9999.9    (X,Y) size of grid in asec
IMSIZE           0.0     4096.0    Image size
NITER                              Number of clean iterations
REFANT                             Reference ant. for Self-cal.
SOLINT                             Solution interval (min)
NMAPS                              Number of Map-Selfcal loops
DOPOL                              >0: Produce Polarization maps
DOCENTER                           >0: Move Source to map center
DOALL                              >0: Do amplitude self-cal
FLUX                               Clip Flux Limit. <0: No Clip
----------------------------------------------------------------
