; CLRSTAT
;---------------------------------------------------------------
;! remove any read or write status flags on a directory entry
;# Verb Catalog
;-----------------------------------------------------------------------
;;  Copyright (C) 1995
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
CLRSTAT   LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
CLRSTAT:  Verb to clear status of image in catalog
USERID     -32000.0     32000.0    User ID.  0 => current user
                                     32000 => any user
INNAME                             Image name(name).
INCLASS                            Image name(class).
INSEQ           0.0      9999.0    Image name(seq. #). 0=>high
INDISK          0.0         9.0    Disk drive #. 0=>any
----------------------------------------------------------------
CLRSTAT
Type: Verb
Use:  CLRSTAT will clear all read and write status flags for a
      cataloged file.  This program should be used if a task has
      terminated abnormally thus leaving a file with an
      erroneous status.  Do not use this on a file which is
      currently active.
Adverbs:
  USERID......User ID of owner of image.  0 => current user
                32000 => any user.
  INNAME......Image name(name).       Standard defaults.
  INCLASS.....Image name(class).      Standard defaults.
  INSEQ.......Image name(seq. #).     0 => highest.
  INDISK......Disk drive # of image.  0 => any.
----------------------------------------------------------------
