Model - image for 6-element A+ configuration

Contours are shown at -7, -3.5, -1.4, +1.4, +3.5 and +7 microJy per beam

ARC SEC

ARC SEC

1.0 0.5 0.0 -0.5 -1.0

1.0

0.5

0.0

-0.5

-1.0