0.1 1.0 10.0 Frequency in GHz 0.1 1.0 10.0

100.0

R.M.S. Noise in MicroJy

0.1 1.0 10.0 Frequency in GHz 0.1

1.0

10.0

100.0

R.M.S. Noise in MilliJy