Plot file version 1 created 22-JUL-2004 21:43:23 Real vs UV dist for 0137+331.CALIB.1 Source:0137+331 Ants * - * Stokes I IF# 1 - 2 Chan# 1

Janskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

2.5

2.0

1.5

1.0

0.5

0.0

Plot file version 1 created 22-JUL-2004 21:43:23 Real vs UV dist for 02405+61138.CALIB.1 Source:02405+61 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

80

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:43:24 Real vs UV dist for 02450+62281.CALIB.1 Source:02450+62 Ants * - * Stokes I IF# 1 - 2 Chan# 1

Janskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

1.2

1.0

0.8

0.6

0.4

0.2

0.0

Plot file version 1 created 22-JUL-2004 21:43:24 Real vs UV dist for N0243+6155.CALIB.1 Source:N0243+61 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:43:25 Real vs UV dist for N0238+6208.CALIB.1 Source:N0238+62 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:43:25 Real vs UV dist for N0239+6005.CALIB.1 Source:N0239+60 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

160

140

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:43:25 Real vs UV dist for J0244+6228.CALIB.1 Source:J0244+62 Ants * - * Stokes I IF# 1 - 2 Chan# 1

Janskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

1.2

1.0

0.8

0.6

0.4

0.2

0.0

Plot file version 1 created 22-JUL-2004 21:43:26 Real vs UV dist for N0235+5956.CALIB.1 Source:N0235+59 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:43:26 Real vs UV dist for N0251+6024.CALIB.1 Source:N0251+60 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:43:26 Real vs UV dist for N0242+6259.CALIB.1 Source:N0242+62 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:43:27 Real vs UV dist for N0246+6133.CALIB.1 Source:N0246+61 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:43:27 Real vs UV dist for 04217+32544.CALIB.1 Source:04217+32 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:43:28 Real vs UV dist for N0422+3234.CALIB.1 Source:N0422+32 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:43:29 Real vs UV dist for N0420+3314.CALIB.1 Source:N0420+33 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:43:29 Real vs UV dist for N0417+3325.CALIB.1 Source:N0417+33 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:43:29 Real vs UV dist for N0421+3405.CALIB.1 Source:N0421+34 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:43:30 Real vs UV dist for N0415+3313.CALIB.1 Source:N0415+33 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:43:30 Real vs UV dist for N0415+3318.CALIB.1 Source:N0415+33 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:43:31 Real vs UV dist for N0422+3127.CALIB.1 Source:N0422+31 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:43:31 Real vs UV dist for N0429+3319.CALIB.1 Source:N0429+33 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

450

400

350

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:43:31 Real vs UV dist for N0422+3058.CALIB.1 Source:N0422+30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:43:31 Real vs UV dist for J0428+3259.CALIB.1 Source:J0428+32 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

600

500

400

300

200

100

0

Plot file version 1 created 22-JUL-2004 21:43:32 Real vs UV dist for 04197+55560.CALIB.1 Source:04197+55 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:43:32 Real vs UV dist for 04183+54573.CALIB.1 Source:04183+54 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

350

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:43:32 Real vs UV dist for N0419+5530.CALIB.1 Source:N0419+55 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:43:33 Real vs UV dist for N0420+5634.CALIB.1 Source:N0420+56 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:43:34 Real vs UV dist for N0424+5545.CALIB.1 Source:N0424+55 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:43:34 Real vs UV dist for N0413+5607.CALIB.1 Source:N0413+56 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:43:35 Real vs UV dist for N0413+5659.CALIB.1 Source:N0413+56 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:43:35 Real vs UV dist for N0419+5722.CALIB.1 Source:N0419+57 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

500

400

300

200

100

0

Plot file version 1 created 22-JUL-2004 21:43:35 Real vs UV dist for J0418+5457.CALIB.1 Source:J0418+54 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:43:36 Real vs UV dist for 07382-24039.CALIB.1 Source:07382-24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

90

80

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:43:37 Real vs UV dist for N0741-2647.CALIB.1 Source:N0741-26 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:43:37 Real vs UV dist for N0740-2444.CALIB.1 Source:N0740-24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

400

350

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:43:38 Real vs UV dist for N0743-2503.CALIB.1 Source:N0743-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

90

80

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:43:38 Real vs UV dist for J0738-2403.CALIB.1 Source:J0738-24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

90

80

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:43:38 Real vs UV dist for N0729-2527.CALIB.1 Source:N0729-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

140

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:43:39 Real vs UV dist for N0732-2607.CALIB.1 Source:N0732-26 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:43:40 Real vs UV dist for N0745-2451.CALIB.1 Source:N0745-24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

600

500

400

300

200

100

0

Plot file version 1 created 22-JUL-2004 21:43:40 Real vs UV dist for 05389+26189.CALIB.1 Source:05389+26 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:43:40 Real vs UV dist for 05390+25596.CALIB.1 Source:05390+25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:43:41 Real vs UV dist for N0536+2547.CALIB.1 Source:N0536+25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:43:41 Real vs UV dist for N0542+2639.CALIB.1 Source:N0542+26 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:43:41 Real vs UV dist for N0536+2712.CALIB.1 Source:N0536+27 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:08 Real vs UV dist for J0538+2559.CALIB.1 Source:J0538+25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:44:08 Real vs UV dist for N0540+2507.CALIB.1 Source:N0540+25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:44:09 Real vs UV dist for N0540+2444.CALIB.1 Source:N0540+24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:44:09 Real vs UV dist for N0545+2530.CALIB.1 Source:N0545+25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:44:09 Real vs UV dist for N0544+2600.CALIB.1 Source:N0544+26 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:44:10 Real vs UV dist for 06171+09082.CALIB.1 Source:06171+09 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:44:10 Real vs UV dist for 06192+07367.CALIB.1 Source:06192+07 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

160

140

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:44:12 Real vs UV dist for N0610+0919.CALIB.1 Source:N0610+09 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:44:12 Real vs UV dist for J0619+0736.CALIB.1 Source:J0619+07 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

140

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:44:12 Real vs UV dist for N0621+1022.CALIB.1 Source:N0621+10 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:44:12 Real vs UV dist for N0623+0811.CALIB.1 Source:N0623+08 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

200

180

160

140

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:44:13 Real vs UV dist for N0624+0843.CALIB.1 Source:N0624+08 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:13 Real vs UV dist for N0618+0731.CALIB.1 Source:N0618+07 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:44:13 Real vs UV dist for 06227-00207.CALIB.1 Source:06227-00 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:44:14 Real vs UV dist for 06276+03250.CALIB.1 Source:06276+03 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:44:14 Real vs UV dist for N0622-0050.CALIB.1 Source:N0622-00 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:44:14 Real vs UV dist for N0619-0019.CALIB.1 Source:N0619-00 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:44:15 Real vs UV dist for N0624-0103.CALIB.1 Source:N0624-01 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:44:15 Real vs UV dist for N0622-0109.CALIB.1 Source:N0622-01 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

140

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:44:15 Real vs UV dist for J0627+0324.CALIB.1 Source:J0627+03 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:44:16 Real vs UV dist for N0626-0118.CALIB.1 Source:N0626-01 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:17 Real vs UV dist for N0628+0005.CALIB.1 Source:N0628+00 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:44:17 Real vs UV dist for N0629+0029.CALIB.1 Source:N0629+00 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:44:17 Real vs UV dist for N0625-0211.CALIB.1 Source:N0625-02 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:19 Real vs UV dist for 09286-30497.CALIB.1 Source:09286-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:44:19 Real vs UV dist for N0930-3102.CALIB.1 Source:N0930-31 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:44:19 Real vs UV dist for N0928-3049.CALIB.1 Source:N0928-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:44:20 Real vs UV dist for N0926-3202.CALIB.1 Source:N0926-32 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:20 Real vs UV dist for N0925-3047.CALIB.1 Source:N0925-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

60

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:44:21 Real vs UV dist for N0933-3219.CALIB.1 Source:N0933-32 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:44:21 Real vs UV dist for J0928-3048.CALIB.1 Source:J0928-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:44:21 Real vs UV dist for N0932-3001.CALIB.1 Source:N0932-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

90

80

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:44:22 Real vs UV dist for N0929-2930.CALIB.1 Source:N0929-29 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:44:23 Real vs UV dist for 09445+03581.CALIB.1 Source:09445+03 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:44:23 Real vs UV dist for 09389+03145.CALIB.1 Source:09389+03 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:44:23 Real vs UV dist for N0944+0423.CALIB.1 Source:N0944+04 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:44:24 Real vs UV dist for N0946+0419.CALIB.1 Source:N0946+04 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

90

80

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:44:24 Real vs UV dist for N0945+0435.CALIB.1 Source:N0945+04 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:44:24 Real vs UV dist for N0947+0430.CALIB.1 Source:N0947+04 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:24 Real vs UV dist for N0939+0304.CALIB.1 Source:N0939+03 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

160

140

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:44:25 Real vs UV dist for N0949+0454.CALIB.1 Source:N0949+04 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:44:25 Real vs UV dist for N0943+0208.CALIB.1 Source:N0943+02 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

80

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:44:31 Real vs UV dist for N0942+0410.CALIB.1 Source:N0942+04 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

90

80

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:44:31 Real vs UV dist for J0938+0314.CALIB.1 Source:J0938+03 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:44:32 Real vs UV dist for 11182+48021.CALIB.1 Source:11182+48 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:44:32 Real vs UV dist for 11106+48179.CALIB.1 Source:11106+48 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

180

160

140

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:44:34 Real vs UV dist for N1113+4718.CALIB.1 Source:N1113+47 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:35 Real vs UV dist for N1116+4636.CALIB.1 Source:N1116+46 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:44:35 Real vs UV dist for N1126+4830.CALIB.1 Source:N1126+48 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:44:35 Real vs UV dist for N1117+4628.CALIB.1 Source:N1117+46 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:36 Real vs UV dist for N1117+4951.CALIB.1 Source:N1117+49 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:44:36 Real vs UV dist for N1121+4618.CALIB.1 Source:N1121+46 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:44:37 Real vs UV dist for J1110+4817.CALIB.1 Source:J1110+48 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

180

160

140

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:44:37 Real vs UV dist for J1628-1415.CALIB.1 Source:J1628-14 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:44:38 Real vs UV dist for N1614-1545.CALIB.1 Source:N1614-15 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:38 Real vs UV dist for N1623-1703.CALIB.1 Source:N1623-17 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:38 Real vs UV dist for N1616-1705.CALIB.1 Source:N1616-17 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:44:39 Real vs UV dist for N1612-1622.CALIB.1 Source:N1612-16 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:44:39 Real vs UV dist for N1613-1436.CALIB.1 Source:N1613-14 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:44:40 Real vs UV dist for N1620-1524.CALIB.1 Source:N1620-15 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:44:40 Real vs UV dist for N1620-1727.CALIB.1 Source:N1620-17 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:41 Real vs UV dist for N1624-1609.CALIB.1 Source:N1624-16 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:41 Real vs UV dist for J1459-3655.CALIB.1 Source:J1459-36 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

500

400

300

200

100

0

Plot file version 1 created 22-JUL-2004 21:44:42 Real vs UV dist for N1459-3139.CALIB.1 Source:N1459-31 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:42 Real vs UV dist for N1457-3151.CALIB.1 Source:N1457-31 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

60

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:44:43 Real vs UV dist for N1502-3139.CALIB.1 Source:N1502-31 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:44:43 Real vs UV dist for N1504-3117.CALIB.1 Source:N1504-31 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

60

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:44:44 Real vs UV dist for N1501-3310.CALIB.1 Source:N1501-33 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:44 Real vs UV dist for N1450-3101.CALIB.1 Source:N1450-31 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:44 Real vs UV dist for N1507-3137.CALIB.1 Source:N1507-31 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:44:45 Real vs UV dist for N1507-3149.CALIB.1 Source:N1507-31 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:44:45 Real vs UV dist for N1450-3124.CALIB.1 Source:N1450-31 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:46 Real vs UV dist for N1720-2452.CALIB.1 Source:N1720-24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:46 Real vs UV dist for N1719-2440.CALIB.1 Source:N1719-24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:44:47 Real vs UV dist for N1721-2438.CALIB.1 Source:N1721-24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:44:47 Real vs UV dist for N1723-2504.CALIB.1 Source:N1723-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:47 Real vs UV dist for N1721-2420.CALIB.1 Source:N1721-24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:48 Real vs UV dist for N1721-2419.CALIB.1 Source:N1721-24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:48 Real vs UV dist for N1721-2558.CALIB.1 Source:N1721-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:44:48 Real vs UV dist for N1714-2514.CALIB.1 Source:N1714-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:44:49 Real vs UV dist for N1720-2618.CALIB.1 Source:N1720-26 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:44:49 Real vs UV dist for N1713-2550.CALIB.1 Source:N1713-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:44:49 Real vs UV dist for N1726-3039.CALIB.1 Source:N1726-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:44:50 Real vs UV dist for N1730-3134.CALIB.1 Source:N1730-31 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:44:50 Real vs UV dist for N1725-2947.CALIB.1 Source:N1725-29 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:13 Real vs UV dist for N1721-2935.CALIB.1 Source:N1721-29 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:14 Real vs UV dist for N1724-2901.CALIB.1 Source:N1724-29 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:14 Real vs UV dist for N1654-3846.CALIB.1 Source:N1654-38 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:15 Real vs UV dist for N1652-3834.CALIB.1 Source:N1652-38 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:45:15 Real vs UV dist for N1648-3849.CALIB.1 Source:N1648-38 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:15 Real vs UV dist for N1735-3218.CALIB.1 Source:N1735-32 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:45:16 Real vs UV dist for N1739-2833.CALIB.1 Source:N1739-28 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:45:16 Real vs UV dist for J1751-2524.CALIB.1 Source:J1751-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:45:17 Real vs UV dist for J1717-3342.CALIB.1 Source:J1717-33 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

800

700

600

500

400

300

200

100

0

Plot file version 1 created 22-JUL-2004 21:45:17 Real vs UV dist for N1653-3903.CALIB.1 Source:N1653-39 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:45:18 Real vs UV dist for N1653-3859.CALIB.1 Source:N1653-38 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:18 Real vs UV dist for N1658-3858.CALIB.1 Source:N1658-38 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:18 Real vs UV dist for N1652-3758.CALIB.1 Source:N1652-37 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:45:20 Real vs UV dist for N1739-2806.CALIB.1 Source:N1739-28 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:20 Real vs UV dist for J1745-2820.CALIB.1 Source:J1745-28 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:45:20 Real vs UV dist for N1743-2610.CALIB.1 Source:N1743-26 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:20 Real vs UV dist for N1736-2835.CALIB.1 Source:N1736-28 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:45:21 Real vs UV dist for N1738-2624.CALIB.1 Source:N1738-26 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:21 Real vs UV dist for N1758-2546.CALIB.1 Source:N1758-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:45:21 Real vs UV dist for N1803-2611.CALIB.1 Source:N1803-26 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:45:22 Real vs UV dist for N1802-2652.CALIB.1 Source:N1802-26 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:22 Real vs UV dist for N1803-2652.CALIB.1 Source:N1803-26 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:45:22 Real vs UV dist for N1807-2506.CALIB.1 Source:N1807-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:45:23 Real vs UV dist for J1758-2343.CALIB.1 Source:J1758-23 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

450

400

350

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:45:23 Real vs UV dist for J1757-2358.CALIB.1 Source:J1757-23 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

80

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:45:23 Real vs UV dist for J1832-2039.CALIB.1 Source:J1832-20 Ants * - * Stokes I IF# 1 - 2 Chan# 1

Janskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

1.2

1.0

0.8

0.6

0.4

0.2

0.0

Plot file version 1 created 22-JUL-2004 21:45:24 Real vs UV dist for N1831-2427.CALIB.1 Source:N1831-24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:25 Real vs UV dist for N1831-2259.CALIB.1 Source:N1831-22 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:45:25 Real vs UV dist for N1827-2252.CALIB.1 Source:N1827-22 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

80

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:45:25 Real vs UV dist for N1823-2432.CALIB.1 Source:N1823-24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:45:26 Real vs UV dist for N1824-2253.CALIB.1 Source:N1824-22 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:45:26 Real vs UV dist for N1822-2310.CALIB.1 Source:N1822-23 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:45:27 Real vs UV dist for N1833-2534.CALIB.1 Source:N1833-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:45:27 Real vs UV dist for J1822-1309.CALIB.1 Source:J1822-13 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

80

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:45:27 Real vs UV dist for N1819-1419.CALIB.1 Source:N1819-14 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

60

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:45:28 Real vs UV dist for N1819-1322.CALIB.1 Source:N1819-13 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:28 Real vs UV dist for N1812-1310.CALIB.1 Source:N1812-13 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:29 Real vs UV dist for N1815-1522.CALIB.1 Source:N1815-15 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:45:29 Real vs UV dist for J1818-1108.CALIB.1 Source:J1818-11 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

800

700

600

500

400

300

200

100

0

Plot file version 1 created 22-JUL-2004 21:45:30 Real vs UV dist for N1816-1841.CALIB.1 Source:N1816-18 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

90

80

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:45:30 Real vs UV dist for N1808-1822.CALIB.1 Source:N1808-18 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:45:31 Real vs UV dist for N1809-1546.CALIB.1 Source:N1809-15 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

60

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:45:31 Real vs UV dist for N1806-1627.CALIB.1 Source:N1806-16 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:40 Real vs UV dist for N1803-2456.CALIB.1 Source:N1803-24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:45:40 Real vs UV dist for N1803-2434.CALIB.1 Source:N1803-24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:45:40 Real vs UV dist for N1803-2544.CALIB.1 Source:N1803-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:45:41 Real vs UV dist for N1808-2555.CALIB.1 Source:N1808-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

90

80

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:45:41 Real vs UV dist for N1754-2352.CALIB.1 Source:N1754-23 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:42 Real vs UV dist for J1743-3058.CALIB.1 Source:J1743-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:45:42 Real vs UV dist for J1742-2949.CALIB.1 Source:J1742-29 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:45:42 Real vs UV dist for N1747-2959.CALIB.1 Source:N1747-29 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

350

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:45:43 Real vs UV dist for N1752-3001.CALIB.1 Source:N1752-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

80

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:45:44 Real vs UV dist for N1803-2030.CALIB.1 Source:N1803-20 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:44 Real vs UV dist for N1802-2002.CALIB.1 Source:N1802-20 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:45 Real vs UV dist for N1800-2107.CALIB.1 Source:N1800-21 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:45:45 Real vs UV dist for N1805-1950.CALIB.1 Source:N1805-19 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

200

180

160

140

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:45:46 Real vs UV dist for N1805-1936.CALIB.1 Source:N1805-19 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:45:46 Real vs UV dist for J1733-1304.CALIB.1 Source:J1733-13 Ants * - * Stokes I IF# 1 - 2 Chan# 1

Janskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

6

5

4

3

2

1

0

Plot file version 1 created 22-JUL-2004 21:45:47 Real vs UV dist for N1731-1734.CALIB.1 Source:N1731-17 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:47 Real vs UV dist for N1728-1653.CALIB.1 Source:N1728-16 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:47 Real vs UV dist for N1730-1612.CALIB.1 Source:N1730-16 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:48 Real vs UV dist for N1729-1734.CALIB.1 Source:N1729-17 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:48 Real vs UV dist for N1734-1616.CALIB.1 Source:N1734-16 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:45:48 Real vs UV dist for N1737-1615.CALIB.1 Source:N1737-16 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:49 Real vs UV dist for N1724-1656.CALIB.1 Source:N1724-16 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:45:50 Real vs UV dist for N1743-3309.CALIB.1 Source:N1743-33 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

60

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:45:50 Real vs UV dist for N1749-3045.CALIB.1 Source:N1749-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:45:51 Real vs UV dist for N1753-3119.CALIB.1 Source:N1753-31 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:51 Real vs UV dist for N1746-3404.CALIB.1 Source:N1746-34 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:45:51 Real vs UV dist for N1716-3819.CALIB.1 Source:N1716-38 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

90

80

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:45:52 Real vs UV dist for J1717-3948.CALIB.1 Source:J1717-39 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

800

700

600

500

400

300

200

100

0

Plot file version 1 created 22-JUL-2004 21:45:52 Real vs UV dist for N1706-3721.CALIB.1 Source:N1706-37 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:45:53 Real vs UV dist for N1718-3835.CALIB.1 Source:N1718-38 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:45:53 Real vs UV dist for N1719-3748.CALIB.1 Source:N1719-37 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:45:54 Real vs UV dist for N1717-3637.CALIB.1 Source:N1717-36 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:45:55 Real vs UV dist for N1737-2804.CALIB.1 Source:N1737-28 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:45:55 Real vs UV dist for N1739-2556.CALIB.1 Source:N1739-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:45:56 Real vs UV dist for N1737-2546.CALIB.1 Source:N1737-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

60

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:45:58 Real vs UV dist for N1827-1603.CALIB.1 Source:N1827-16 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:45:58 Real vs UV dist for N1830-1601.CALIB.1 Source:N1830-16 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:46:23 Real vs UV dist for N1833-1513.CALIB.1 Source:N1833-15 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:23 Real vs UV dist for N1822-1309.CALIB.1 Source:N1822-13 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:46:23 Real vs UV dist for N1834-1433.CALIB.1 Source:N1834-14 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

200 180 160 140 120 100 80 60 40 20 0

Plot file version 1 created 22-JUL-2004 21:46:24 Real vs UV dist for J1820-2528.CALIB.1 Source:J1820-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

800

700

600

500

400

300

200

100

0

Plot file version 1 created 22-JUL-2004 21:46:24 Real vs UV dist for N1819-2453.CALIB.1 Source:N1819-24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:25 Real vs UV dist for N1822-2559.CALIB.1 Source:N1822-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:25 Real vs UV dist for N1817-2659.CALIB.1 Source:N1817-26 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:46:25 Real vs UV dist for N1817-2335.CALIB.1 Source:N1817-23 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:46:26 Real vs UV dist for J1823-2726.CALIB.1 Source:J1823-27 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

700

600

500

400

300

200

100

0

Plot file version 1 created 22-JUL-2004 21:46:26 Real vs UV dist for N1820-3016.CALIB.1 Source:N1820-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:27 Real vs UV dist for N1820-3011.CALIB.1 Source:N1820-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:28 Real vs UV dist for N1827-3059.CALIB.1 Source:N1827-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:28 Real vs UV dist for N1819-3055.CALIB.1 Source:N1819-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:46:28 Real vs UV dist for N1823-2826.CALIB.1 Source:N1823-28 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:29 Real vs UV dist for N1809-3650.CALIB.1 Source:N1809-36 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:29 Real vs UV dist for J1802-3940.CALIB.1 Source:J1802-39 Ants * - * Stokes I IF# 1 - 2 Chan# 1

Janskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

2.0

1.8

1.6

1.4

1.2

1.0

0.8

0.6

0.4

0.2

0.0

Plot file version 1 created 22-JUL-2004 21:46:29 Real vs UV dist for N1807-3639.CALIB.1 Source:N1807-36 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:30 Real vs UV dist for N1809-3725.CALIB.1 Source:N1809-37 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:30 Real vs UV dist for N1807-3621.CALIB.1 Source:N1807-36 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:46:30 Real vs UV dist for N1812-3634.CALIB.1 Source:N1812-36 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:46:31 Real vs UV dist for N1806-3744.CALIB.1 Source:N1806-37 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:46:31 Real vs UV dist for N1813-3649.CALIB.1 Source:N1813-36 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:31 Real vs UV dist for N1804-3756.CALIB.1 Source:N1804-37 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:32 Real vs UV dist for N1814-3735.CALIB.1 Source:N1814-37 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:46:32 Real vs UV dist for N1810-3503.CALIB.1 Source:N1810-35 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:46:32 Real vs UV dist for N1709-2642.CALIB.1 Source:N1709-26 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

140

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:46:33 Real vs UV dist for N1711-2632.CALIB.1 Source:N1711-26 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

60

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:46:33 Real vs UV dist for N1709-2557.CALIB.1 Source:N1709-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:46:33 Real vs UV dist for N1707-2716.CALIB.1 Source:N1707-27 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:34 Real vs UV dist for N1712-2717.CALIB.1 Source:N1712-27 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

160

140

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:46:34 Real vs UV dist for N1718-3056.CALIB.1 Source:N1718-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:46:34 Real vs UV dist for N1718-3238.CALIB.1 Source:N1718-32 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:46:35 Real vs UV dist for N1713-3226.CALIB.1 Source:N1713-32 Ants * - * Stokes I IF# 1 - 2 Chan# 1

Janskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

1.4

1.2

1.0

0.8

0.6

0.4

0.2

0.0

Plot file version 1 created 22-JUL-2004 21:46:35 Real vs UV dist for N1718-3001.CALIB.1 Source:N1718-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:46:36 Real vs UV dist for N1752-2837.CALIB.1 Source:N1752-28 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:46:36 Real vs UV dist for N1740-2842.CALIB.1 Source:N1740-28 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:46:36 Real vs UV dist for N1756-2807.CALIB.1 Source:N1756-28 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:46:37 Real vs UV dist for N1808-2124.CALIB.1 Source:N1808-21 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:46:37 Real vs UV dist for N1805-1851.CALIB.1 Source:N1805-18 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:38 Real vs UV dist for N1811-2144.CALIB.1 Source:N1811-21 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:38 Real vs UV dist for N1800-2447.CALIB.1 Source:N1800-24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:46:39 Real vs UV dist for N1812-2552.CALIB.1 Source:N1812-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:46:39 Real vs UV dist for N1805-2938.CALIB.1 Source:N1805-29 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:39 Real vs UV dist for J1807-2506.CALIB.1 Source:J1807-25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:46:40 Real vs UV dist for N1804-3017.CALIB.1 Source:N1804-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

60

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:46:40 Real vs UV dist for N1809-3025.CALIB.1 Source:N1809-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:40 Real vs UV dist for N1812-2836.CALIB.1 Source:N1812-28 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

450

400

350

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:46:41 Real vs UV dist for N1812-3012.CALIB.1 Source:N1812-30 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:46:41 Real vs UV dist for N1812-2800.CALIB.1 Source:N1812-28 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:46:59 Real vs UV dist for N1813-3310.CALIB.1 Source:N1813-33 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:00 Real vs UV dist for N1809-3337.CALIB.1 Source:N1809-33 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

60

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:47:01 Real vs UV dist for N1812-3458.CALIB.1 Source:N1812-34 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

180

160

140

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:47:01 Real vs UV dist for N1818-3237.CALIB.1 Source:N1818-32 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:01 Real vs UV dist for N1808-3233.CALIB.1 Source:N1808-32 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:47:02 Real vs UV dist for J1838+0404.CALIB.1 Source:J1838+04 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

700

600

500

400

300

200

100

0

Plot file version 1 created 22-JUL-2004 21:47:03 Real vs UV dist for N1841+0522.CALIB.1 Source:N1841+05 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:03 Real vs UV dist for N1837+0538.CALIB.1 Source:N1837+05 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:04 Real vs UV dist for N1842+0541.CALIB.1 Source:N1842+05 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:04 Real vs UV dist for N1843+0530.CALIB.1 Source:N1843+05 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:04 Real vs UV dist for N1838+0628.CALIB.1 Source:N1838+06 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:47:05 Real vs UV dist for J1922+0841.CALIB.1 Source:J1922+08 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

200 180 160 140 120 100 80 60 40 20 0

Plot file version 1 created 22-JUL-2004 21:47:05 Real vs UV dist for N1914+1128.CALIB.1 Source:N1914+11 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:06 Real vs UV dist for N1917+1046.CALIB.1 Source:N1917+10 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:06 Real vs UV dist for N1919+1126.CALIB.1 Source:N1919+11 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:06 Real vs UV dist for N1908+1045.CALIB.1 Source:N1908+10 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:07 Real vs UV dist for N1913+0919.CALIB.1 Source:N1913+09 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:47:07 Real vs UV dist for N1909+1202.CALIB.1 Source:N1909+12 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:07 Real vs UV dist for N1922+1016.CALIB.1 Source:N1922+10 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:47:08 Real vs UV dist for N1905+0829.CALIB.1 Source:N1905+08 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:08 Real vs UV dist for N1903+0911.CALIB.1 Source:N1903+09 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:09 Real vs UV dist for J1907+0127.CALIB.1 Source:J1907+01 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

450

400

350

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:47:10 Real vs UV dist for N1912+0008.CALIB.1 Source:N1912+00 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:47:10 Real vs UV dist for N1907+0000.CALIB.1 Source:N1907+00 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:11 Real vs UV dist for N1915+0022.CALIB.1 Source:N1915+00 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:11 Real vs UV dist for N1914+0124.CALIB.1 Source:N1914+01 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:47:12 Real vs UV dist for N1913+0134.CALIB.1 Source:N1913+01 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:12 Real vs UV dist for N1906+0139.CALIB.1 Source:N1906+01 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

140

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:47:12 Real vs UV dist for J1912+0518.CALIB.1 Source:J1912+05 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:47:13 Real vs UV dist for N1912+0431.CALIB.1 Source:N1912+04 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:13 Real vs UV dist for N1913+0401.CALIB.1 Source:N1913+04 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:13 Real vs UV dist for N1917+0442.CALIB.1 Source:N1917+04 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:47:14 Real vs UV dist for N1907+0604.CALIB.1 Source:N1907+06 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:14 Real vs UV dist for N1919+0518.CALIB.1 Source:N1919+05 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

60

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:47:14 Real vs UV dist for J1910+2305.CALIB.1 Source:J1910+23 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

350

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:47:15 Real vs UV dist for N1900+2237.CALIB.1 Source:N1900+22 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:15 Real vs UV dist for N1901+2238.CALIB.1 Source:N1901+22 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

140

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:47:15 Real vs UV dist for N1856+2306.CALIB.1 Source:N1856+23 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:47:16 Real vs UV dist for N1855+2311.CALIB.1 Source:N1855+23 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:16 Real vs UV dist for N1902+2151.CALIB.1 Source:N1902+21 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:47:16 Real vs UV dist for N1904+2230.CALIB.1 Source:N1904+22 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:17 Real vs UV dist for N1853+2330.CALIB.1 Source:N1853+23 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:17 Real vs UV dist for N1852+2337.CALIB.1 Source:N1852+23 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:17 Real vs UV dist for N1905+2348.CALIB.1 Source:N1905+23 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:47:18 Real vs UV dist for N1904+2113.CALIB.1 Source:N1904+21 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:47:18 Real vs UV dist for J2009+2505.CALIB.1 Source:J2009+25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:42 Real vs UV dist for N2004+2517.CALIB.1 Source:N2004+25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:43 Real vs UV dist for N2004+2600.CALIB.1 Source:N2004+26 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:43 Real vs UV dist for N2002+2605.CALIB.1 Source:N2002+26 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:44 Real vs UV dist for N2005+2419.CALIB.1 Source:N2005+24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:47:44 Real vs UV dist for N2000+2615.CALIB.1 Source:N2000+26 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:44 Real vs UV dist for N1956+2518.CALIB.1 Source:N1956+25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:45 Real vs UV dist for N1957+2424.CALIB.1 Source:N1957+24 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:45 Real vs UV dist for N1955+2501.CALIB.1 Source:N1955+25 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:46 Real vs UV dist for J1953+3537.CALIB.1 Source:J1953+35 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

450

400

350

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:47:46 Real vs UV dist for N1958+3457.CALIB.1 Source:N1958+34 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:47:46 Real vs UV dist for N1959+3450.CALIB.1 Source:N1959+34 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:47 Real vs UV dist for N1958+3436.CALIB.1 Source:N1958+34 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

35

30

25

20

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:47 Real vs UV dist for N1957+3427.CALIB.1 Source:N1957+34 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:47:48 Real vs UV dist for N2001+3442.CALIB.1 Source:N2001+34 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:47:48 Real vs UV dist for N1953+3537.CALIB.1 Source:N1953+35 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

450

400

350

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:47:49 Real vs UV dist for J2007+4029.CALIB.1 Source:J2007+40 Ants * - * Stokes I IF# 1 - 2 Chan# 1

Janskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

4.0

3.5

3.0

2.5

2.0

1.5

1.0

0.5

0.0

Plot file version 1 created 22-JUL-2004 21:47:49 Real vs UV dist for N2032+4042.CALIB.1 Source:N2032+40 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:47:50 Real vs UV dist for N2032+4039.CALIB.1 Source:N2032+40 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

180

160

140

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:47:50 Real vs UV dist for N2033+4000.CALIB.1 Source:N2033+40 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

200

180

160

140

120

100

80

60

40

20

0

Plot file version 1 created 22-JUL-2004 21:47:51 Real vs UV dist for N2037+4000.CALIB.1 Source:N2037+40 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:51 Real vs UV dist for N2039+4025.CALIB.1 Source:N2039+40 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:51 Real vs UV dist for N2035+4217.CALIB.1 Source:N2035+42 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:47:52 Real vs UV dist for N2028+4227.CALIB.1 Source:N2028+42 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:47:52 Real vs UV dist for N2037+3915.CALIB.1 Source:N2037+39 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:47:52 Real vs UV dist for J2140+3911.CALIB.1 Source:J2140+39 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

450

400

350

300

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:47:53 Real vs UV dist for N2145+3744.CALIB.1 Source:N2145+37 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:53 Real vs UV dist for N2148+3759.CALIB.1 Source:N2148+37 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:47:53 Real vs UV dist for N2141+3906.CALIB.1 Source:N2141+39 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:54 Real vs UV dist for N2144+3718.CALIB.1 Source:N2144+37 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:47:54 Real vs UV dist for N2137+3740.CALIB.1 Source:N2137+37 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

25

20

15

10

5

0

-5

-10

Plot file version 1 created 22-JUL-2004 21:47:55 Real vs UV dist for N2140+3643.CALIB.1 Source:N2140+36 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

15

10

5

0

-5

Plot file version 1 created 22-JUL-2004 21:47:55 Real vs UV dist for XGT2318+62.CALIB.1 Source:XGT2318+ Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

8

6

4

2

0

-2

-4

-6

-8

-10

Plot file version 1 created 22-JUL-2004 21:47:55 Real vs UV dist for J2302+6405.CALIB.1 Source:J2302+64 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

250

200

150

100

50

0

Plot file version 1 created 22-JUL-2004 21:47:56 Real vs UV dist for N2313+6309.CALIB.1 Source:N2313+63 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

60

50

40

30

20

10

0

-10

Plot file version 1 created 22-JUL-2004 21:47:56 Real vs UV dist for N2311+6305.CALIB.1 Source:N2311+63 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

80

70

60

50

40

30

20

10

0

Plot file version 1 created 22-JUL-2004 21:47:57 Real vs UV dist for N2309+6301.CALIB.1 Source:N2309+63 Ants * - * Stokes I IF# 1 - 2 Chan# 1

MilliJanskys

Mega Wavlngth

0.2 0.4 0.6 0.8 1.0

90

80

70

60

50

40

30

20

10

0