Fig. 12. Spectra of SiO (J = 2 → 1, v = 1). Each panel shows the spectrum obtained with the autocorrelator (lower spectrum) and the one obtained with the filter bank (upper spectrum). The latter is shifted arbitrarily upwards for clarity.